Title: Evaluation
Course: Accessible by Nature: Designing EE to Support All Learners > Section: Evaluation and Certificate

Please share your experience in the course with us! Your feedback will help us make improvements to this course for future participants.  Thanks in advance for sharing feedback about your experience!

After you complete the evaluation, you will be able to download your completed EE form.

Alternatively, you can use this link to open the evaluation in a new tab.